http://identifiers.org/biomodels.db/BIOMD0000000488#e71e61dc_491a_4898_8889_5a438e2e8caa
constant: true
value: 6.0E-7
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#e9527616_118d_4c89_bdf9_ff4855a2873f
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_68f8f901_6bc0_4b50_baf0_83929af5fc2b
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_632413fc_ad15_472d_9362_7b3199b8ddc4
constant: true
value: 1.0E-5
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_9a0dc7ce_007a_434b_8f30_bb9c940bcf2e
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_45baec4c_8c07_46f2_bbc9_21cfc78e9610
constant: true
value: 4.95E-4
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_7171aa39_5e5d_4e6d_99be_6b3f980014ee
constant: true
value: 1.0E-4
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_3d4dd713_cf1d_4a2f_b33d_8b4b36ef1b5f
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_093abe48_c278_4649_9fcd_47ae1b928f53
is version of: IPR002955
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_058793b4_760f_4fb9_a38d_720222ce5567
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_06ff9474_62eb_424a_bf11_4e6a10da9f85
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8e505d05_e394_4320_9229_192d3ea61a49
constant: true
value: 1.0E-6
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_5dcec317_cfe5_4d23_973b_392542d9d2bf
notes: Glia associated with plaques but not able to phagocytose
is version of: CL:0000129
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_18227c98_787a_41bc_8c0e_64414767166c
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_9b33cd24_4ced_4c0a_b7fb_923b03b191b3
reversible: false
fast: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#da7bae00_3e3b_452f_a349_00340aad82d0
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_05562b10_fa82_44c1_b2fa_1d366f941609
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_4ad83edd_f424_47d5_b9cc_3fbc3f5610f2
constant: true
value: 0.1
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#f2d01ca8_c6eb_47d9_ab1c_d38bd50d43b5
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#b517e064_004e_45c8_88e3_333a8d784c1d
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_3889c303_6f9c_4eb7_b4ee_5429fef0e4c9
has part: GO:0000502
has part: IPR002955
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_0cd08593_4b59_41d4_94fa_d8fb01e99e7c
stoichiometry: 2.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d641f24b_37df_4c5b_8451_8aea598731cc
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e9795f25_e8df_44cd_b815_e883b89ebafa
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_46438057_a872_4ea1_bfaa_4ee6d00f37bd
constant: true
value: 1.0E-7
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_259e4ba5_3cd8_4e57_bca3_2940bbe2f93e
has part: P05067
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_4a7cc657_ffef_4a0b_949f_ce54f6dbcd3b
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d465abd2_9574_4820_a45d_934c6255f255
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#e1a571ad_f8ee_49c2_ad0d_3ed5e05d33eb
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_082bd98a_7390_4ed3_8c7c_819c2ee7d25e
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#fafba704_6660_4668_9f38_15a7d12f0262
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_7ae9dc6f_042b_4350_b8fe_1dc8b345196b
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_2e76a2ea_b9a1_4a11_960b_1d9e3eee7c8b
reversible: false
fast: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#d8fbc952_15bf_4535_b1b3_a30f39e87933
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_439da263_f83e_451c_8b89_171118126662
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e2062272_8631_4d2e_9751_fd8e536c78c0
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#f67b5336_9491_4ecc_b1b5_7009a7de67b0
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#a1849613_a972_43ef_994c_b713e1ebd418
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_256e4df1_e5b6_4690_a329_18f50594caba
constant: true
value: 6.84E-6
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_9d0cdba6_c9f7_4589_9550_3fb273a01386
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_3ee899f5_92f2_4bc4_9012_bf3d540434f1
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#cc38792f_e7dd_46e6_b855_b450da0f697c
is version of: IPR001394
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 200.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_81dac7f1_eb23_4110_960e_068f7fbec058
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_495dc17c_422b_4368_909d_0ce0b4f0f288
notes: Glia associated with plaques but not able to phagocytose
is version of: CL:0000129
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_59a201ad_2d20_4865_983b_decf8181c7ff
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_28f3cc26_c909_46dd_ba58_ac1370db5886
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e70b6eba_5747_47f3_be0e_e19325db09e2
has part: P62988
has part: Q00987
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_4f1f6ce3_52f3_4f3c_bc14_1ed35021be1c
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#b89ffacc_2b26_484f_af51_6c8a19e4408b
type: Reaction
reversible: false
fast: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_48dd638e_7cff_42f7_8011_4c8debea8a6a
is version of: CHEBI:15422
constant: true
boundary condition: true
has only substance units: true
initial concentration: NaN
initial amount: 10000.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#f48b343b_8dd2_4b1c_96b3_00eb49958c57
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_29e5215b_c968_46c5_b88c_ed840ee8db35
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#cbaf9ede_da68_47e6_947d_cfb9b2bacfcc
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_6657b5e6_34a1_495c_9cb4_2fc9d9f039ad
constant: true
value: 1.86E-5
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_1da4b2fc_4b4d_4968_9588_3a79e064f816
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d28a41aa_0a81_4eab_a4eb_a5b93b98fd68
constant: true
value: 0.005
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_06f35071_ee05_4347_bc36_f4d11bb4637e
reversible: false
fast: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#edd0a70f_313b_40eb_9a11_bf2f9d41df84
constant: true
value: 2.0E-6
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#c74b8525_6261_412a_bc82_efda50e98a52
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e66cbfe7_f25d_4475_bf4f_939799cea7f1
constant: true
value: 5.0E-4
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_50a6c023_d2cb_46f6_8805_43b0aa3b116f
constant: true
value: 5.0E-4
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_6bef232b_45c5_48c6_80e1_77d05a17d47c
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_053b2295_466e_451e_9d4c_856a8f0d12b1
has part: P62988
has part: Q00987
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#febecc40_2c22_4ebc_8219_adddee0322a6
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_1b674f02_311a_4611_b4ee_6ee1f8c43ab9
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_446b82ec_239e_43ff_986f_9a4d6e682363
constant: true
value: 0.1
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#f3f98a82_afa3_4ab5_a20d_5a42694fa432
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_0cfab630_e65a_4fbb_a091_d99353e1196f
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_720633f1_11d5_4dcd_8861_71a8a2f5c677
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_72075df8_a895_481c_b968_09cd42a7d75d
is version of: IPR002955
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_177314f5_70ed_4c3a_b4bd_cfdbde7bd6c1
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_9e4f518f_eb1d_4a6b_bbc6_1016edebb19f
type: Reaction
reversible: false
fast: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_01686fdd_9a88_40e7_ac15_742e309b8a17
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#b29b50ee_7755_4664_96f1_345d4da535ac
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_576861dd_6c75_40b6_a477_205fd3d1e0d8
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_1e7eff66_e577_462c_90b1_5179ba810f1e
type: Reaction
fast: false
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_01329467_c503_4256_905a_b7eb681bdff4
constant: true
value: 7.0E-5
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_9dfdc99c_b722_42ce_9039_11434a88d8ca
constant: true
value: 2.0E-4
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#ce9a9aba_b498_4851_b2cc_97e14445801c
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_67f61a06_c72f_4c75_8fe6_5eb73afbbd6d
constant: true
value: 0.001
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_60218117_19e3_40cf_b0fc_867bf3972cc6
is version of: P04637
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 5.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_265bbb39_96bd_402f_953d_3f60aad5806a
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_404d0900_43a2_4825_ba28_1c9be70150ee
has part: P62988
has part: Q00987
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_0f8a56dd_58e3_4a35_9b7c_63627164ae9b
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#b4fef229_25e9_499d_9e27_bf0a94e9e8c5
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_4d1d3a96_202a_43e2_8d5b_fcdb12718649
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#fd266d4b_3c99_4ed8_a2cd_2d56f0108eba
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#c7af4d29_28d9_48d6_8ed3_cd070b6f84a7
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e5b87102_4867_4849_b94b_4fdd50d037d8
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_36a027f9_d43a_4802_b5dc_61e94b3b0158
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_2a95d641_360e_4849_94ad_d446992e8078
is part of: IPR001394
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 200.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_9f934cc2_34b5_43db_8441_ac61ef772765
is version of: IPR000011
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 100.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_8764e8ca_5950_4099_b393_eaf7cffc1f9e
is version of: IPR002955
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_5afe69b8_9a47_4705_92cd_17c10b2a255b
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e02d5188_d435_4827_a6fc_60e09561513b
stoichiometry: 2.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#a14c8d54_10fb_477c_bd28_c138a4a20072
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_139d2383_ba43_4a8c_9865_96d76283f924
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_0336b7af_1cc7_4b9f_8073_c62de3a293cb
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_0bbbbb26_9a42_447c_bf6e_b5b423c6a8e9
constant: true
value: 8.0E-5
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_3cb09d74_e1c4_417f_a02c_dcd1fbfe0b58
constant: true
value: 0.5
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_862174ea_dc5f_4b20_823f_abd7ae6dd2b6
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_36cd113e_c0a0_4a95_aecd_d2856ea9064e
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_1830aeba_0673_4138_a341_b11f5f74baf0
type: Reaction
fast: false
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#fc5774fb_97a6_4bb6_8b9e_7bf9ecb4b5a4
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_9e26b363_261a_4e01_8641_1634c1f5a98c
fast: false
type: Reaction
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_9fb31755_8e56_484b_adbd_ddcf88c945c6
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_244fb470_607a_4456_bbc9_5c841677a8ce
has part: P04637
has part: P49841
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#aa2fcd8c_3bcc_4d01_9ba1_2928788f2564
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_3151e761_f683_4a2c_86f6_6f625b5a33e2
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#cc68bb62_bd76_4d8c_8a4a_bd228a03ad3d
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_1dcfe83a_4ac9_4c81_ab5f_974f333fa39f
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_594e2a69_c661_4f3f_8f93_df4cfffeec4d
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_0252a276_a45e_4e5d_b2f3_d6ec2bc597ef
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_23c2c13e_856f_49fb_8e21_13ab18005d23
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_3a133754_be1b_4857_b92f_8218855b5c12
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#f3153f8f_d54e_4a5e_ba47_ea61ed5c4954
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#be783c22_3992_4e5a_8a39_8f32a2ae7bee
constant: true
value: 0.01
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_8c7bcc09_fddc_4227_b7c5_63a7c608423b
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_9e99005a_56ab_4a17_b99d_167c3d713251
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#dd8863fc_b819_4dc4_b369_5c921c66b6c0
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#cfa5a9e1_5dfa_4db5_9e0e_a78aa73722c7
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_77f4a2ce_a1b1_42c7_b245_e99163f7af54
stoichiometry: 1.0
type: SpeciesReference

BIOMD0000000488
is described by: journal.pone.0073631
created:
  W3 CDTF: Tue Sep 24 12:45:36 BST 2013
creator:
  ORG:
    orgname: EMBL-EBI
  n:
    given: Vijayalakshmi
    family: Chelliah
modified:
  W3 CDTF: Wed Oct 09 18:13:04 BST 2013
name: Proctor2013 - Effect of Aβ immunisation in Alzheimer's disease
is version of: DOID:10652
curated: true
time units: time
area units: area
is: MODEL1212030000
creator:
  ORG:
    orgname: Newcastle University
  n:
    given: Carole
    family: Proctor
volume units: volume
occurs in: http://identifiers.org/taxonomy/40674
type: SBMLModel
is part of: PW:0000015
is version of: GO:0030330
length unit: length
is derived from: BIOMD0000000286

http://identifiers.org/biomodels.db/BIOMD0000000488#a31ea8b9_ba87_41b3_9a8b_2274ecd2523c
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_66469792_3197_4c93_829f_d4f6e256baf6
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#b817d317_42a0_40ca_aeaa_5f3c7fe7ffdd
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_91637dd2_55a7_49f2_a484_24f457e157f4
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_6e3c9f13_8083_4600_a717_51b26bcd000c
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_476a4bf1_7961_4bca_b6dd_886df19c1875
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_3e3d4988_43c9_4754_b05f_346d878d8da7
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_338ec781_a100_49cb_ae01_91324ece9d8d
has part: P62988
has part: Q00987
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#d0f57294_4986_4e64_9140_ef51f6a45597
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_408db250_c940_4559_9e34_bca203898b5e
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e1c6fe1c_fbca_4c61_975a_df1fd50a58ac
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#e5febe70_a2b8_4c6b_beb2_b65e02452146
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_1f578afa_aa07_4aee_bd98_84786a871cef
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e4b98446_08f2_4f73_b2c9_3ce0e8ff4588
is version of: P62988
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 4000.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#d8f9abd0_08d6_4b60_bbdc_f06af7efad4c
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_7fcad63f_979e_4278_b19f_497cc4c0818f
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#bbd8fb1c_77ce_48a3_b085_62f2c938facc
type: Reaction
fast: false
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#efc63dd8_0fff_4635_9a32_4eba49ed0694
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d17a5f37_0874_416b_894e_7f9112ff0267
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#bfdf7f13_2946_4a51_b973_01de51c726f6
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_604ebc2a_6524_4af8_adaa_9d40e19d5920
constant: true
value: 1.0E-6
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#fef1da69_9680_4187_84c8_d11f1cd6102b
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_2321ffb5_6ae1_4c04_91ed_3a592a10d930
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_931f417b_58b7_405e_909a_69c75b93c094
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_9d6536cd_141f_464b_bc15_0d167da2be3d
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_79a861d8_7257_43f6_ab4c_f98e47e7dda5
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#c8929b5e_7290_4de3_b79b_ec82dc7d4d6e
constant: true
value: 1.86E-5
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#ef6f404f_2351_4a53_b817_3070ba0c91cf
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8a439ac7_051a_426e_a694_c4c4a1f8c421
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_57d20aac_f174_4e50_b8fe_017d8c569ad2
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_4edd6c8c_ade0_4421_a07d_6cab01ef7967
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8e29d9ed_f8ac_476b_944b_e0ef369e6ea5
initial concentration: NaN
boundary condition: false
initial amount: 0.0
type: Species
has part: P62988
has part: P04637
constant: false
has part: Q00987
has only substance units: true

http://identifiers.org/biomodels.db/BIOMD0000000488#a7328a20_c527_4b90_b989_c0406534ab08
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#ef0cb1a0_f1c9_42a7_b349_8c8b519ed3e5
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_7f623d04_c771_4ce6_9b16_446bb9e39804
fast: false
type: Reaction
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_3af97553_9b55_4249_8e4c_0b5ff464fe6e
is version of: IPR000608
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 100.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_96bc381a_13c3_48ce_9900_1377bd2c9b2c
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8b8da4f3_c948_47b3_9a49_6b266767393e
stoichiometry: 2.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_1aa6b493_1664_4a9f_b0c2_5165b10e9e9f
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d5c4e09e_8165_441c_8676_6e6ad54c1dc6
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#b09c1a1a_4d03_47f5_85f4_da79cc75a31d
constant: true
value: 5.0E-5
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_0e7a20b4_197f_455b_b15d_826d15429363
reversible: false
type: Reaction
fast: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_830a8688_07b9_4d53_b70d_87edc7d49dcb
has part: GO:0000502
has part: IPR002955
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_7d0d6b32_0a78_474a_9c0d_925096464a13
type: Reaction
fast: false
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_0da63099_3a49_4560_97e8_463ac94d396c
constant: true
value: 2.0E-4
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#de4f420e_7c83_49b8_8ba3_e6b48925cf8c
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d795a4a0_a760_4361_8bc6_56f45a7b95de
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d7e80f41_9800_40d5_a028_5c06b93eb7ee
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_59a45806_a67a_4e7b_b3e7_10a6a3c597dc
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8903f2ee_ab80_4528_8f32_3da0de8654ef
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_9a1a2278_7e75_4a7e_9fa8_37bd6e44e8c4
has part: P04637
has part: P49841
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#a93d7c86_bcdb_4235_a176_ceef6f173bb3
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_3d38b8b6_6373_47e9_bbb2_2f64cef8fe77
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_25e80637_fe98_42ca_8820_8ecd83faeeb7
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e2acad7e_6b8f_45ae_b663_de32c35b0418
reversible: false
type: Reaction
fast: false

http://identifiers.org/biomodels.db/BIOMD0000000488#c3351e7c_ec42_49b0_a80d_cbf6a97819b6
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_73185b9c_8455_464a_989c_b26d164ebac9
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#ff92183d_04c0_41e7_ac47_0298d59cd03f
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#ac2a466c_3f96_40ba_9913_62cbb28ee035
is version of: Q13315
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#df427677_9cd6_4135_a6e0_9044e2e7d16c
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_76be5c7a_3703_4941_9b09_29f4f3f8a96a
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_83e56235_ae83_4625_b1aa_ba480fc5b005
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_3d10ed19_0f77_42fe_a8b7_9ab72e6f8f7c
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#dbd71438_f993_426b_a355_bce0ed5fc888
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e0068255_66c5_46ff_83cb_fe6a6de2ce6c
constant: false
value: 1.0
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#b73b7eea_5231_4a4e_b221_68582cb1f27d
constant: true
value: 3.0E-6
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_6599b030_b206_44d3_a97e_fdd318a3f904
constant: true
value: 2.0E-5
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#b1f3ca68_cb4d_4046_a025_1d2fa128e400
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_46a0782d_6ec1_44e4_8686_91b764c7729b
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_97383eab_e228_447e_98f4_1a0731af0641
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_5c442b5c_335a_4427_9c37_8ab7a39118a7
type: Reaction
reversible: false
fast: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_45699d37_270d_4858_bd46_b548596b19c9
reversible: false
fast: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#f0c0ab5c_f22d_43c3_9c6f_983495351d4c
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8d613e2b_ea68_4ef8_96c4_8a9440076abd
constant: true
value: 2.0E-4
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_12051d51_59ca_4dac_ae05_12a3e649d358
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_4e689951_a7cd_49f5_a193_34d94dff9ac4
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_2c2b374c_acbf_428d_a826_1f87a51a5ab1
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_6a3f5794_0321_48d8_b6f4_eb331a2c7a12
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#adcac53a_4d30_472b_96e7_9fc26163c950
has part: P62988
has part: Q00987
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_9d3fb58b_883e_460d_879c_ff9902e42f99
reversible: false
type: Reaction
fast: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_0f02482c_9476_4870_9c06_bba88c00ee3d
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_9d1ca394_8a7c_4d1e_950a_eafe0ac2fd93
use values from trigger time: true
type: Event

http://identifiers.org/biomodels.db/BIOMD0000000488#_35095497_2cdf_41ea_8d87_861f4ff66638
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_2493efa9_6eeb_4ed4_addc_6390bc40b4f0
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_811815b5_3312_44f1_8a78_0a681d226379
type: Reaction
fast: false
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#e144d76d_caf2_4fc2_beed_2ed88c3148fc
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#f66a34ce_f460_484e_bb76_4aa006a26c28
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#c9a4bd98_35e0_4a6a_8dbb_e5c9621c9abf
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_5c71f137_d67e_45d8_ae33_8bc04d6aef74
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_4cf4e094_f604_4b0f_bc16_e7defbe1b727
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#fc3030fc_97b6_42b0_8b8c_600bf84a1d5e
constant: true
value: 2.0E-6
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#f0df1b04_0e2f_4763_8d96_7db735432c11
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_53ce3557_3f2a_4a10_b1cf_de326ab43e80
has part: IPR000011
has part: P62988
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_993f0706_9c5f_456e_8455_218fbdc12edd
is version of: CHEBI:16761
constant: true
boundary condition: true
has only substance units: true
initial concentration: NaN
initial amount: 1000.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_13841232_1868_4c8f_9eca_b01ad7ad7b84
is version of: GO:0000502
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 500.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_326358f3_2e93_4f2c_b779_6ba68787a96f
stoichiometry: 2.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_74c8e768_1865_4605_a925_b0dd1c66cb22
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_29e70075_3590_43b6_92d1_036789dc338a
fast: false
type: Reaction
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#e8d334bf_9f81_41c3_8eeb_5000dbb55743
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#ecb0ced8_023a_4efa_a2f7_9c848a2ff815
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8674d2d8_1882_4c3a_9109_623be07910e3
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8a7d69fe_3116_4040_951d_c344f39b413b
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8ae6ab79_54b1_406f_b1a3_354ec4128dd1
is version of: CHEBI:26523
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_88969a4b_606e_4494_b707_2db42f9b90af
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#bf3b5d05_4772_4c30_a9c7_fcc096f19674
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#dc93e554_746f_46cb_a7d0_43ebbc2b4d60
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_2a94df4f_d08d_4d3d_b707_1aca107210d3
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_98003030_6aa6_42bd_9172_a9a22e6027e3
has part: GO:0000502
has only substance units: true
constant: false
boundary condition: false
initial concentration: NaN
type: Species
initial amount: 0.0
has part: P62988
has part: Q00987

http://identifiers.org/biomodels.db/BIOMD0000000488#_0ecd2444_3bc0_4eb3_ba05_26b23fbf9cb1
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_5f8026ed_3faf_48b5_b617_90931f2e37e3
type: Species
has only substance units: true
boundary condition: false
has part: Q00987
initial concentration: NaN
constant: false
has part: P62988
initial amount: 0.0
has part: P04637

http://identifiers.org/biomodels.db/BIOMD0000000488#_5b704f10_c2e0_41c4_a5a8_b6b81e402b55
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#b118cd8c_782d_4118_895c_5cf403164a5b
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_47df70ed_b753_42a7_8bcc_8e405e814c7f
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_3ffab371_9b06_4469_94e1_06617469c50e
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_766c386f_39c8_4b2d_9c4b_6b2813282699
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_3100b69a_8a8c_4d8a_89a2_0a8f81cfc560
constant: true
value: 1.0E-4
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_76280817_4767_4736_9738_c3645047e5c3
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#f7698010_8e90_4e1a_9722_be8893169f33
stoichiometry: 4.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_52d50c09_d04c_4f4c_ace7_16864793c2dd
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_2460d947_fd69_4def_a018_10cbc742e1c7
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8749e95f_ad15_4bd3_9c09_f921c0af2e89
has part: IPR000608
has part: P62988
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#f46d9ea4_1aa1_43f5_84ac_4bfe8fdbd86f
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#fa389b09_11b5_41c8_b5c2_cf2ec5ebb812
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_44fbe1a9_1794_4f15_abce_2c0aab7ce024
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_1a0fc402_b25e_4ead_a442_a91546b87f55
constant: true
value: 0.005
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_7d51f14c_b37b_4c7a_b2d4_43c4c0c4657d
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#dcfb8fc9_af7d_414e_ada8_8a956ea885b3
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#f1955860_dc77_4fb4_abbe_678ad2e1b3ed
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#f87b009e_456b_43a3_85a8_341d34a252cf
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d4ff56c1_ed6b_4d72_a544_f574be8dbbd9
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#aa17966c_69e7_4c43_938c_1057095ea421
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8d5dd05a_6830_46c2_b2c5_8d86686a4d82
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#f1f013e8_d45e_496a_91e3_9b8bd9f0d48a
constant: true
value: 1.0E-6
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_3f4b8edc_8bdc_4474_9cfc_44a58e536f90
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#c6bee4b9_49e3_4014_a1d1_8a39414d63e0
reversible: false
fast: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#d94d0f0a_993c_4216_8bb4_b3a3f3929df0
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_1d343c59_58fa_44db_8212_512a6f0cf4ff
is version of: Q13315
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 200.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_235106f6_2a06_4306_883a_6d9ab681cd30
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_03bd353a_b56d_4ca7_9069_7fa0b2222f89
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_809ca669_f4bf_4048_8696_8571f8201511
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#ad50b2eb_6d6f_4c1f_9812_70a9b401e94e
constant: true
value: 5.0E-6
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#fd9fb37c_d30d_467b_bc60_841936e66829
is version of: P05067
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#fa200209_3882_4159_8e12_bcd1fc5fa953
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e1063c98_71b8_4714_8ff8_589498404dcf
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_57383926_e165_4437_88b9_5d1361ba14d2
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#c271c2bb_1046_4d24_9a59_e1168e8025e7
stoichiometry: 2.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_11bfb969_ebac_4a88_8dae_77855730a6f8
has part: P62988
has part: Q00987
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#ef9a4afd_9b0e_4c65_b3de_e2462519848c
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_95b69ef1_0d51_4a28_b585_03c12bc8d1bb
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_46fad6bb_6fc5_4d91_95a5_db9dcc99923f
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_48968614_1290_47c4_89eb_1f6e94349bd5
constant: true
value: 0.01
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#e1bd75d0_b254_4662_a663_ed345ba0f3cf
stoichiometry: 2.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d73a5a37_be34_4381_8f12_c699af2413fc
constant: true
value: 1.0E-7
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_31d6e228_5a08_4f8e_a25e_3fdfcae650ce
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_1886e31d_0366_44e8_9df2_7fe42773d131
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_6532b6a5_a468_49b2_a48c_d68f03e94199
reversible: false
fast: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#aebee344_3fa3_4b2d_878f_b69928a559d7
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_37f6461a_b69f_4746_8908_5c8127559456
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_9c38ce12_8875_48e8_9778_ea905dbe6a77
constant: true
value: 1.0E-7
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#a72a18ea_20ae_4f07_b07c_205f55ff2150
stoichiometry: 4.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#a9b8c802_f06f_489e_b379_29986d09ae84
fast: false
type: Reaction
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#c9c445fd_d584_4f6f_8ee1_d6bddfd0313a
constant: true
value: 1.0E-8
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_921cf7cd_e8f1_4ce4_8852_0ad5f0fc15aa
reversible: false
fast: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_203db308_0e0e_441c_b701_0f70e98c58fb
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e64c9653_fd0b_41b5_ae75_2497edf1e468
is version of: P62136
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 50.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#b41cd512_31e3_481d_9b1f_7167e9c38a32
constant: true
value: 0.00456
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_1e72f7c6_4b2a_43e1_b411_e5add17b0268
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_197cec8a_7839_4909_a745_b317281cac40
type: Reaction
fast: false
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_0a225b5b_268c_4a0a_b849_8797a38443d9
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d54c61fa_ebac_4dd5_8737_89eaa8e01303
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_9f9ae7da_ce0c_4722_9c46_0ff6123d4647
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_7e5ded24_88f9_44bc_86c6_535a09f5dc71
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_7ea321ad_e394_4190_8fda_1a2c5d1ca863
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_4eae3aab_fc11_48d7_ad37_844dc37a0fdf
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e1292eb6_202d_44f3_b89c_a932827fa0ad
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_2c08b7c5_9737_4b7c_a8c6_82eb0e057b06
constant: true
value: 1.5E-5
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_01227a7b_2054_4a20_ada0_bb4b466d6258
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#b828cb00_e24e_4d42_b015_42d6fa78d028
fast: false
type: Reaction
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#f8ca7c24_188c_4922_bbc8_feb88ea52752
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#eff9c09d_b529_4b2e_bde6_b339646f6a56
constant: false
initial concentration: NaN
initial amount: 0.0
has part: Q00987
has part: P04637
has part: P62988
boundary condition: false
type: Species
has only substance units: true

http://identifiers.org/biomodels.db/BIOMD0000000488#cae6d06f_eb3b_49b9_b389_5b324f956d2e
fast: false
type: Reaction
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_4c00e4df_e274_4191_a2df_59bde4ed56d0
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#b513c03e_5159_4948_b344_eab2a2005ade
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#be9af7e2_0408_4e84_920b_64aa6d59340f
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_9da3a3b4_1517_4bf4_9906_6789e86d1562
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#d0de6858_e9b5_45a3_b87a_e617f0c302ee
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#ba5df382_acd5_4b82_a58d_dbbc7c270337
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#f66faceb_a2fd_4ae8_a599_e13ac6ddbda5
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#bc4d1b33_5270_4946_82eb_5aa524a2e62d
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#cebf3655_d005_4b4e_b9a4_930e30d0aca9
fast: false
type: Reaction
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#f3008e0f_b40b_456d_bd38_5980ba7e2ac7
fast: false
type: Reaction
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_4f184a72_ada9_4cc3_809a_a6227ab8c98d
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#a2675e8f_58da_43f0_b02a_8b48219c7e89
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#fc26b5a4_068e_4d23_b9e2_050b42dd60ea
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_916907b2_2382_4366_ae0b_e19133ed82c3
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_310fc9e8_57f4_470b_bb5e_fd21982830f1
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_13183413_1a8c_4d0c_b4a5_3653397b6cfd
reversible: false
fast: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_28a651d5_5bca_44f7_a8e0_11247c43a626
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_3074dfbb_f91c_47ce_bcb8_c9f7c3efc6d8
constant: true
value: 0.2
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_626d3f07_b5f1_4097_9bc9_dd75b34261f5
constant: true
value: 1.0E-4
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_6cefeec3_f407_404f_a792_bf050bc881d4
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e8952de6_cba7_4d3a_a93f_8b69cec16675
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#f04f209d_9fd3_48b7_b262_cd1afe6543f7
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e526cdc4_3286_47ff_910f_3fe3fc4322b1
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#a174cf43_42cb_4097_a80d_03f7e645989b
constant: true
value: 1.0E-4
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_54439d13_9b62_4d96_8110_7fd808eb85bd
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#c4e90123_ec81_415a_b3af_f37b4945ad92
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#eabacdad_526f_40a9_b834_ac0a0d9faf4d
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_0c522f63_99b3_4dcb_bf5c_598041ec9945
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_726ec7b0_0a59_4ba7_81f9_62e749b6f247
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#eee81fcb_f2c1_491b_b80a_2dd7df16eeec
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_133e9276_0fc0_4cb6_b1e5_127b7b31ab70
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#daf74fdd_bc6f_49e4_a47c_b3b21224e1a3
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_55f8b120_a851_454e_ad38_60781f47a9e4
stoichiometry: 2.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_08f8cb5f_359f_47c1_8207_78a41bff48a2
constant: true
value: 0.5
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#c3f64490_ebd0_4d6b_aca9_35627c7cbe85
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_58053aee_40ca_41ce_8ef4_8906cfc3deac
is version of: CHEBI:16991
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_7c41b9b8_c7f7_4fc9_a152_2d1d1a84f05f
constant: true
value: 0.001
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#e3f95c12_83c8_47bb_aada_04259df8f565
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_7f77fa62_81d2_46b3_b172_23576cd92ce8
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#e0b4cf98_bc59_443c_983f_5dcbd26a962a
constant: true
value: 4.56E-6
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_934fd6cd_5c72_4c33_bb92_b9ef4fa0e68c
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_5433eb89_4659_4fb7_baa8_6def6d8583f6
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_68e1c638_93fa_448a_9bd4_432213fd3382
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_6f21d9c6_e4a8_456c_8e5f_8051156492cb
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_5065562d_dc85_4c55_a110_94ebd9bd2d74
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_232a3540_cbbc_420b_aa47_1724e0753752
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_75939f60_04cf_4f28_94e3_db19b6131eb9
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#f3fd6792_ebc5_4963_b83e_67d93f38ffce
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#b5c650f3_9767_42fa_81ca_20bdeff885f0
constant: true
value: 0.007
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_5fec82c4_b27d_459d_b85e_ee19219a7e51
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_89d5ddc5_910d_439d_84ff_b2e0e8d54662
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_18fc0cd6_0178_4d0c_a6d2_e75d499ca201
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_641b701d_2b6d_4209_b9fd_6f901edec3ec
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_62fdf3a3_8c90_4dd2_b98c_a645053d47c6
initial concentration: NaN
boundary condition: false
type: Species
has part: P04637
has part: P62988
has part: Q00987
initial amount: 0.0
constant: false
has only substance units: true

http://identifiers.org/biomodels.db/BIOMD0000000488#_27620af3_63fb_40bc_9f6e_0581d6293853
is version of: IPR015562
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 100.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_15dba60f_d6fc_44ad_b5d8_a8d8af6fe2d2
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_68941cbc_7e91_4f7e_a622_bb111f7bee57
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d842e783_ca6b_43e2_97ee_e45c190ba516
encodes: P04637
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 10.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_5505bd29_5dd4_449f_85f7_032018c91352
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_1f2285d5_6740_4f86_8347_8846c0be6409
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_05a254a0_a8f1_48eb_80c1_de280f0cd8b6
notes: Inactive glia
is version of: CL:0000129
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 100.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_6d49fa85_b3c7_41b0_ab84_e3325a984196
type: Reaction
fast: false
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_8614fba8_67d7_4f84_b5f6_2a71f64bbc2f
type: Reaction
fast: false
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#e51c7909_f414_491b_b5af_0d369743fb67
stoichiometry: 2.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_083a203f_4ee8_48c7_8a0b_2b1a94053f41
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_750da000_beb1_4262_a59b_1b8cafe58023
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#ed584403_1b41_47a9_8477_fe5e5dacf556
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#acf0c394_3af0_4b2c_8d8f_7f057ddc77b0
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#b86aef07_7966_441b_b045_38d392ff0bb2
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e95410d6_2975_41be_9ac3_5aa69b80e07e
stoichiometry: 2.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_503638a7_b5d7_4a58_a9db_ba9fb40681a1
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_4497c4de_245a_4d2e_87ee_cc77407cd453
persistant: true
initial value: true
type: Trigger

http://identifiers.org/biomodels.db/BIOMD0000000488#d4e66094_80c9_40bc_a743_6c8186949b79
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#b8d36aca_3629_4a08_a2e8_4cb292963a88
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8a4be89e_98c3_4d60_9916_0b86b194f1cb
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e889cac8_3f8b_4040_9981_6f05d2148e2f
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#c5e6e827_e13e_4b33_9727_7a9c67e94e77
stoichiometry: 2.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_03632c8b_dcbe_47d2_85ed_a8f4a2d6087c
type: Reaction
fast: false
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_225b8d36_5463_4280_ba14_2ce40e51f4a8
is version of: IPR001394
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 200.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#fcebec61_06e2_46b4_8cbd_adfefc26ef53
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_36b53547_d03b_4331_ba3c_eb71c7ae0ee5
fast: false
type: Reaction
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_062b36fa_c888_41f6_84e1_3d7b43f6c124
stoichiometry: 2.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#f155fe60_e662_4dbe_97f7_6ac805282f6e
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_11af1168_e5f0_4b99_b4ed_079d1d27c864
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e3f1ed16_dd45_4b21_bd7f_af0eae592694
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#a733b0de_d40a_49b4_bc33_ea235d308540
type: Reaction
reversible: false
fast: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_73dec4e5_8169_4f81_957f_1c756ea780e2
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e1f7f7b8_6533_4aa7_8026_5714a339fff7
is version of: GO:0005623
constant: true
size: 1.0
spatial dimensions: 3.0
type: Compartment

http://identifiers.org/biomodels.db/BIOMD0000000488#a7e32bf0_8593_458d_9048_949eb7263f3e
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_093d90e5_bb77_4322_8e41_b3ab4d52ba63
fast: false
type: Reaction
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#d7ae4eeb_c424_46b6_b860_9d7f55a51598
type: Reaction
fast: false
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#a9a0112c_0ec8_4ec9_b287_9d6eb8e8ec4c
constant: true
value: 2.0
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_4ce335c2_711e_4796_9352_0de810b53d8c
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#a3920313_0c58_49d0_a0ed_d3b82615ebaa
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_6f19d968_47f4_4bc5_a078_507776c7e241
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_274c50f8_7ae6_476b_acce_a9046e37ea62
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_1adca3b1_ef0a_493d_987d_80a689bf4373
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_68feb497_7d71_44e6_a795_cc9999578f08
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_5c33c6a1_e82e_423b_91f2_69c0252df656
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_03098e0c_aca8_4d42_a052_2168ccf87e24
constant: true
value: 5.0E-4
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#e9763417_0cd2_4e39_a426_428dc3a6f897
is version of: P49841
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 500.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_9a45792c_b4fb_4cc3_9b31_00e841a3cc6c
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_0d39c823_875c_47b5_ae4f_eb3cde2556f8
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d6f9a57f_2d1c_4fa2_9bd2_d3a9da0cdf5a
has part: CL:0000129
has part: P05067
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_758b89e5_3d5d_491b_91a9_65ad26d06b06
constant: true
value: 0.005
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#fed25231_87d8_486a_8448_209f3cd1d454
has part: P62988
has part: Q00987
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_43d2617f_cc0f_4235_bf1f_df0ff52b1a47
constant: true
value: 2.0E-4
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_70d9cecc_c396_4be8_a664_b386bc38c387
stoichiometry: 2.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_5a9f9f25_10b4_4878_aee9_83b6b78c06dd
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8e61e645_95cd_4a22_b58b_fbf3628780a4
constant: true
value: 1.0E-5
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#e8b0b9f0_0be7_4b96_8910_af5501beb23a
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_576f87bf_4558_4d21_a67e_b99d881110b8
constant: true
value: 1.0E-7
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_13415fd2_0d71_408f_ab3b_e08ae9c9d028
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_4f991834_2d5e_49a3_b081_fff98e40461c
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_8612ad1e_bb16_49af_a724_6d746d28d60b
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_57c4bf73_d990_4c92_b76e_c1f7d8f94d0d
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#b55d5a1b_973f_4316_af41_7d2926adf962
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_7b7b91fa_adeb_4f90_9de3_46592e29c030
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_25b33ccd_5f92_47ae_9a40_6aace6bca71c
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#a7a007f2_dabe_4544_be83_2453c9954b8c
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_32da9470_021d_42de_83d7_59449a775b60
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_34b5a67a_fd57_4a92_be93_33e47e59a938
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_09103f1d_79bd_415c_843a_e122d26eb8fc
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_3aa63311_f7d8_4c5a_8cbe_311a3377baa0
is version of: P04637
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_4632b6c0_1fbd_491d_a001_c51a62a5c828
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#a23b6e8e_75aa_44b2_a8e0_d5b0d6f36530
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_3aded42d_0e56_4bfe_9ed3_433e41344022
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_73d7c41c_fdcf_494d_9690_cc7d7dba952a
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_37c5fa96_eb16_4839_9da6_a135056b0545
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_3a167843_b6b1_4859_a7c0_a44b5272f992
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#f493a694_a305_4383_bf50_6002725458ec
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_1c6f33dd_1a2c_4864_a390_3ec912d01129
has part: P05067
boundary condition: false
initial amount: 0.0
has part: FMA:62871
initial concentration: NaN
constant: false
has only substance units: true
type: Species
notes: Abeta monomer bound to antibody

http://identifiers.org/biomodels.db/BIOMD0000000488#_8c690088_f4e1_4488_945d_11482d6c6080
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_5540ab92_699f_4253_9a64_a37c57020672
type: Reaction
fast: false
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#f1b00f32_33d6_454c_9114_c6e1739de78c
is version of: Q00987
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_9db2ab81_a24e_40b2_86e3_fa79fbfa1c6e
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#f8456a67_3a1a_4463_b138_58a224dbf21d
boundary condition: false
initial amount: 0.0
has part: P05067
initial concentration: NaN
type: Species
has only substance units: true
notes: Abeta dimer bound to antibody
constant: false
has part: FMA:62871

http://identifiers.org/biomodels.db/BIOMD0000000488#_51c55f0d_b1b5_4545_ac6b_d37f919edf3b
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_33fd2501_1773_4069_b026_242ffd09f34b
reversible: false
fast: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_8fbdf985_f3e8_489a_b438_1ee75686d2cd
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#cfa5ee81_644b_4654_9af3_ffd9aec3ea64
reversible: false
type: Reaction
fast: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_52357e0a_d77c_4ff2_a6be_982819a099ca
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#df9af698_1861_459d_9a17_0fa99d3b73d2
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_1ab54d26_2aa2_4474_9e97_96d96ef9d2f5
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_4f55e22a_fbff_4497_b576_2e40e7c10f37
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#f394d04a_a552_46e9_8554_2483472126a6
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_5b082ffb_008b_48a8_b20e_49ad7f1e11c6
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_354c175a_7f6c_4ea6_b7d0_6accbd39c26c
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#db259d5a_d40c_47cf_bcc7_066bc1f91913
constant: true
value: 6.0E-7
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_9fcf839c_9c6d_45b0_92b5_c33e74920815
is: SBO:0000291
constant: true
boundary condition: true
has only substance units: true
initial concentration: NaN
initial amount: 1.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#c3e5070e_8d34_4dbd_b267_1fc083314364
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#a14865af_f214_4f0c_9b4e_8fe573e7c855
fast: false
type: Reaction
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_36d6d5c3_bfcd_4886_a028_54d6f6f2b0e4
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_26413141_6fd5_4140_9645_a0a4b8e6aecc
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_26c2d3a6_8ad4_4c5d_94be_266407e5ed08
is version of: IPR002955
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_0f7fab4a_f3a1_4d78_abb1_fa3588e5cbb2
type: Reaction
reversible: false
fast: false

http://identifiers.org/biomodels.db/BIOMD0000000488#c4b76aca_998f_410f_a763_5bae167b2492
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_35b095b2_6e4f_4e78_bc01_970c7eb9af89
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8fb26ac8_28e9_4e31_9153_bf75d8e23dc2
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e76f05ba_eef4_424b_b248_b7f84858ba0c
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_18354624_5d2e_4baf_9e62_73650bcd6da6
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_72f3e88e_20ad_4de0_a8b3_91889465271a
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_25c235f7_2bb8_4736_94da_e3e8c983173d
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_3a58d092_a1d5_498f_93fc_defc622dc879
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_16ab7038_2013_4e95_8444_91d800b50fd4
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8d2baf29_f1ed_46b8_bcde_58404e06e9bb
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_00ed4c61_901c_482c_80ab_0f860cd53b89
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_93c21f4e_c9aa_4145_9d4a_90bdd39f8982
notes: Active glia which can phagocytose
is version of: CL:0000129
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_8d22a3e4_ec82_4848_b256_dd042c857bbf
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_931e83b1_4212_49f1_b2e5_e7ce6ce8b68f
stoichiometry: 4.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_700bfdcc_e631_4b51_939d_c3de68cb1e1f
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_19a492fa_7c8f_4e73_bfec_45151b4b7fd5
encodes: Q00987
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 10.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_46947912_e7ed_432f_9cd2_f994c9450193
reversible: false
type: Reaction
fast: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_84884def_f68e_4b69_acc6_b45ff56ce414
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_97833020_562f_416a_923f_dee16afe40ba
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#ce91d346_8c00_4c85_a2a2_232f059365a2
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#dc03e91f_5b4d_4b71_92e8_5b559dca5a5f
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d1be5300_1528_4e86_8f19_9e2df287d014
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#a8ee29fc_e421_4c47_b580_0eac5a97202c
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_7975a918_5af3_437d_ab47_01037365db85
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_9b4c566d_f3a7_4a21_acae_2810e5ead302
constant: true
value: 1.0E-5
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_0782712f_a87b_4f36_a51f_1f5b12ba52bc
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#f0eafe4e_cf72_4fd1_a39b_c7f8a74cd110
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_20113e87_def6_471e_a512_987d9e81c841
type: Reaction
fast: false
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_147136cc_059d_498e_919f_e4656c16eb01
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#ae297d80_c7f3_4de9_a4fd_bb9e948b7667
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_1d0906b3_731a_4fa9_bef8_deb67127b15b
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_83271a8e_8337_4404_9ba0_0aa4ece7f7b3
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#eef13cdf_2bdf_415e_bea4_c17a6af59465
has part: P62988
has part: Q00987
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_1e599692_1517_43d6_8ffd_4b23358b8bfd
fast: false
type: Reaction
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#c1cd6461_0b3e_46d4_82cf_d97ea7898bb9
reversible: false
type: Reaction
fast: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_93e7b5d5_e810_4362_aa7c_f5eb4debe4e6
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d8602631_30b6_4e87_9515_9bab0d513e9e
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_1aa756be_01ff_468f_8706_0d14a0bfe8b7
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_16b5040d_d32c_4964_be14_67801323f1cd
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_166f8568_b42b_4d89_8750_1e3bf36bdd8f
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d0a4442a_aed7_48c1_a5c6_3b7600333695
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e8243f69_9de9_4cf9_b9a0_8892f5af6105
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#cb2c97fc_9ff2_4bed_ad91_481cc7243745
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#c0064017_0a8a_4554_8536_edee1723e1d1
constant: true
value: 1.925E-7
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_4f8c183b_0a2c_4026_bb9e_0ff43fb27a7c
constant: true
value: 0.08
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_268c4514_06d2_424d_b72a_40f6d8a1e56d
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_4b274bb4_8ae4_4f56_ac1e_cab3ad23c3c7
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_7698b4c2_9345_47b4_b702_84c2de883474
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_25f5190b_52d6_4f34_8d6c_b355840da9e1
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8e5e889d_9ec8_4acb_b841_6f599171f97a
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#df91618a_cead_457e_b550_65cd643918a1
stoichiometry: 2.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8bd1eff6_a0d0_4c76_bf4d_b9b829a5939f
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_055a0ec8_d5f6_4bd9_bc15_c5daa7b4a247
reversible: false
fast: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_38201262_2e6b_473f_ac3f_7b100d25479d
type: Reaction
fast: false
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#baf11f5d_15be_45e6_bd50_f74d7b54e68e
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_057c3c10_d0bf_4e46_9d23_83d2972a8660
constant: true
value: 7.0E-4
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#f7961817_a364_4522_b0f8_459bc583b5d7
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#fc1aa2a6_71c7_48a9_8e1d_f1513c9d289d
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_0bd07646_8ef2_4022_8e7f_c65f15ea9666
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_3dad6712_6a60_48d9_9963_5f47e8abc298
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_97ad46df_b263_4b0e_abd2_fc604bba03d4
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e6e7b53d_7452_415c_bf42_396afebb4023
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#a0121306_d849_4c43_8efc_c305e2d89307
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#aaeef9a1_77f9_492c_b476_fb392e138e00
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#bb0c0cbf_b804_4be5_81a1_6d255e304e65
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#f1847d5e_3473_4866_9048_db070ef6e905
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_7574558d_fb6b_4102_a724_94a0f839de1a
constant: true
value: 0.01
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#adbd5d75_d65a_4959_bf4a_e7da032130f7
constant: true
value: 1.0E-5
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_2249e70a_36c0_4eaa_aa6f_85d632f17492
exponent: 1.0
scale: 0
multipler: 1.0
kind: ITEM
type: SBMLUnit

http://identifiers.org/biomodels.db/BIOMD0000000488#d27b3403_d098_4fbf_bbe4_a7c90667f3cf
is: SBO:0000291
constant: true
boundary condition: true
has only substance units: true
initial concentration: NaN
initial amount: 1.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#a5ef97e8_29c2_441e_9259_790d7051dbff
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d29bbbc6_917c_411c_87be_c027882e9eb0
reversible: false
fast: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_8ee8263c_6084_4fb6_8d85_58deabc59a7d
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e30bc281_c978_423a_99e0_919c510c6f20
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8cc434f5_d863_40d7_9a36_37b185a58206
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#f85e44bd_1477_47b5_9b3e_4a7079ffee58
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8e32da87_eb36_46b2_9553_f22ead777f18
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_60cdd078_2dfb_42b6_b352_563f81901c79
constant: true
value: 2.75E-6
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_61629820_0afa_4e3f_af5c_fa1f27cc661d
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_99d4b00d_26ac_4d95_be8e_d52781b351e5
constant: true
value: 1.0E-5
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_71267bd7_fd4b_4cc1_aa53_fa0a1980c283
stoichiometry: 2.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_21687f3f_ed82_4008_b7d4_c7446bb7e8c3
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_6e8c89c5_b6ac_406e_a863_94de06ed5b74
constant: true
value: 1.155E-5
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_6fbd399f_2556_4ec2_a66b_5c328150b50e
reversible: false
type: Reaction
fast: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_7c957d91_25cf_4933_8bd1_c3246620520f
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_19a49df5_161c_4a4e_868b_45913bddb6e1
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_8a975967_ab79_4e68_aae5_3f39a83dd3b9
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#ee449f60_e7a1_4245_a56d_22c9c06e6f95
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_107ec729_9a63_489c_a0f0_684d63e88a72
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_7f19080c_6e31_4517_932a_df3dbe880ee9
constant: true
value: 0.5
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_2207c5a0_efe6_40de_a7b1_8a1cf78aecab
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#fe5330fe_f95f_46dc_a0be_6c7956780210
type: Reaction
reversible: false
fast: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_5440c7c7_7c7b_4a35_bdf3_c54df48f4cc7
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#e1ac9690_271e_4fca_a5c8_9ef74de24287
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_77c9c3ef_a264_4ba4_bfd0_4a98b79399c7
reversible: false
fast: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_7deba8b0_043e_46a0_87ae_a560cd949297
type: Reaction
fast: false
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#caf0c6ed_b016_40ff_86db_dc3a60511653
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_9deaf28c_4611_40da_9243_6533e8c493bd
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#fe8dd7d3_076e_4608_b195_38f3b60c9327
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_5a779838_798c_4220_a6d1_52979ec1ba95
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_7bc2cef7_af3d_4592_aac8_1a16a940663a
is version of: IPR002955
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_6c73ce36_8657_4d26_86bc_5dfd424ef0e4
constant: true
value: 0.001155
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_738c7de8_98c8_4561_a709_cd073ef61cbc
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_30b4499b_bd9c_486e_8733_c477423685f5
type: Reaction
reversible: false
fast: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_69e78d43_f1b8_48b1_b9c6_227fd3886709
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_10c60236_0163_45d7_b4cb_49706e3fd800
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_1eb4b4b2_d27e_4b4f_8b2e_452923616ced
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_1db96310_0d08_4b59_a47f_ac22771b6794
is version of: P05067
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#cd9c7a25_0d97_4546_b528_befc572a63c9
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_992807bc_f367_4400_b076_c709bbd5d129
constant: true
value: 0.001
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_5bc53052_57fa_4883_b78e_d385ae8c4177
constant: true
value: 0.15
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_51ca6412_971a_4258_8dff_d0e2d3a02935
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_95dea53d_632d_4b67_adf6_e244b7fcc5bf
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_0f7e89a5_4fa2_4eb8_a21e_5feacbf44d70
constant: true
value: 5.0E-6
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_1a7b6ee5_d6a5_47c8_a294_ba9d4f0d901c
notes: Antibody against amyloid-beta
is version of: FMA:62871
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#aa1c7706_defd_4f58_a24d_ff971c5bc42a
fast: false
type: Reaction
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_1b8c2657_0ceb_491d_9fa5_33f0904ffbb4
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_21ab40da_799f_4b5d_b3af_724c5ef077f4
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e8d8bd89_d3d5_4273_8fa8_31f6014f69e7
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e1d7cbbd_4c37_40c2_a7f2_bdda7d53e31f
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_1b497a87_6f95_484b_85c6_67da3c511c2b
constant: true
value: 0.01
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_0dc3b538_b20b_43ba_8d3b_74d957f9e29d
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_3538946c_a278_446e_9f8b_d6f5ddd58abc
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_072ba3ab_8ee2_4484_9cc1_4ec619e183fd
constant: true
value: 2.0E-5
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#b9d7bc08_b9b9_4bff_84ce_e8f6ff6d8e32
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#ffd164c1_9e07_418e_ba82_bf4ee5295118
has part: GO:0000502
boundary condition: false
has part: P62988
initial amount: 0.0
initial concentration: NaN
has only substance units: true
has part: P04637
constant: false
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#fb165c6c_3f80_4108_af6f_23853dbb9344
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_5f6fec5a_0b62_4a28_881c_9ed063693ff4
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#f0db5407_7bc9_4372_a858_deb230a61784
encodes: Q00987
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 95.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_983db3cc_f434_4a05_8412_0e3106edac95
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#a07b5412_4d9c_4731_be5d_bff57d320b78
is version of: C00020
is version of: CHEBI:16027
constant: true
boundary condition: true
has only substance units: true
initial concentration: NaN
initial amount: 1000.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_998851fb_4e7f_45db_8633_a091314cb285
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d4e3b440_6771_40ca_9d27_955e1e0ddb37
type: Reaction
reversible: false
fast: false

http://identifiers.org/biomodels.db/BIOMD0000000488#ff9195ee_3284_4f9f_8c29_d8d4804f385b
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#cd9b81d5_006d_4c41_a54a_848dfdf647ba
stoichiometry: 2.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#da3cce5c_9544_4dd8_a5ba_ccf4951cfc76
has only substance units: true
has part: GO:0000502
constant: false
type: Species
boundary condition: false
initial amount: 0.0
has part: Q00987
has part: P62988
initial concentration: NaN

http://identifiers.org/biomodels.db/BIOMD0000000488#_9c80d0df_afa8_4089_a868_736c0e5d2fd9
constant: true
value: 1.0E-8
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#e10a2c1a_38bd_41f2_9b06_d587959271dd
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#acffa222_2234_45a7_a9ee_c5136e42e109
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#e00e5d8a_5657_405c_96f2_c1f24df4e749
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_02a32387_fc43_41be_bfe7_72464842f28f
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_72c37637_0e54_4e29_9c50_cef25aab106c
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_76c28faf_e396_4ca0_ad1e_8ba71218b1b4
type: Reaction
fast: false
reversible: false

http://identifiers.org/biomodels.db/BIOMD0000000488#_8ff07e17_f07e_4c4d_9f23_2d168e4f8694
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_6613ac2d_bbcd_4787_b066_3e0ee35c358e
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_94656fae_2cfc_4f43_ab48_6d5aad86b461
constant: true
value: 10.0
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#c6182eb7_2c5c_4de5_bdd0_bdd60feec7e8
is version of: GO:0000502
is version of: P05067
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 0.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#b6fdc552_90d3_4bb6_96e4_e4940bb60ecc
reversible: false
fast: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_93274e1e_5de8_4ebf_b289_8164e6870cb1
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#aa45d533_be17_4e2a_a82c_8275f5dac937
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_0969e0c1_ec49_46de_bd5a_209b4a042d6d
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#ab98ffcc_4863_48cd_b768_1970f3871f65
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d8c427eb_75f1_48f8_8073_f0e34ff229f8
is version of: Q00987
constant: false
boundary condition: false
has only substance units: true
initial concentration: NaN
initial amount: 5.0
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_300b5450_7eba_4012_aaf4_5384d0ec291f
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#a456a7a2_bed8_4574_885b_d3a7ca7a3701
constant: false
initial concentration: NaN
initial amount: 0.0
has part: P62988
has only substance units: true
has part: Q00987
boundary condition: false
has part: P04637
type: Species

http://identifiers.org/biomodels.db/BIOMD0000000488#_4e552c4f_364e_480d_b7ab_6faa7e27f444
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#fdd1f983_1086_46c0_9f73_8a0d25881229
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_8c4b778a_c7e0_49e1_a18e_089473a2ddb4
constant: true
value: 5.0E-5
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_744b6a86_9399_4438_8bd8_5724ca76b673
fast: false
reversible: false
type: Reaction

http://identifiers.org/biomodels.db/BIOMD0000000488#_0ecf07af_df59_4078_a3e8_8aef0ac08e02
constant: true
value: 0.002
type: Parameter

http://identifiers.org/biomodels.db/BIOMD0000000488#_3cd41a30_42b2_4aae_8fa4_ca64b63bd27d
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d9fb4929_5dec_4589_9916_9c90d5c37570
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d9edc86b_71ba_465c_8e5a_799ccd89b2ca
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#d061d7ab_6932_4975_8846_4716ed7f95a7
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_30c02f7f_4533_4e5d_bc51_e76370aecc3d
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_7c54b337_f97b_48ba_9821_bfc0066987cc
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_337ef703_e507_485c_bc55_7270b9391552
stoichiometry: 2.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#a1128f7b_80df_4fb6_a650_9c3a2561dbcb
stoichiometry: 1.0
type: SpeciesReference

http://identifiers.org/biomodels.db/BIOMD0000000488#_9286be20_f6aa_4b3c_832c_99e1adb795fb
stoichiometry: 1.0
type: SpeciesReference